<template>
	<view class="page">
		<image src="https://api.ccttiot.com/smartmeter/img/static/uCVscXCz98dUNHckgAkz" class="bj" mode=""></image>
		<!-- ??? -->
		<view class="wuche">
			<image src="https://api.ccttiot.com/smartmeter/img/static/utgzG3HnNvNgeoMnuKqg" mode=""></image>
			<view class="fujin">
				
			</view>
		</view>
		<tab-bar :indexs='3'></tab-bar>
	</view>
</template>

<script>
	export default {
		data() {
			return {
				bgc: {
					backgroundColor: "",
				},
			};
		},
		methods: {},
	};
</script>

<style lang="scss">
	page {
		background-color: #fff;
	}

	.wuche {
		width: 100%;
		text-align: center;
        margin-top: 340rpx;		
        image{
			width: 490rpx;
			height: 460rpx;
		}
		.wz {
			width: 100%;
			text-align: center;
			font-size: 32rpx;
			color: #929292;
			margin-top: 20rpx;
		}

		.fujin {
			width: 256rpx;
			height: 90rpx;
			background: #EEF6FF;
			border-radius: 10rpx;
			font-weight: 600;
			font-size: 36rpx;
			color: #74AEEE;
			text-align: center;
			line-height: 90rpx;
			margin: 20rpx auto;
		}
	}

	.bj {
		width: 100%;
		height: 100vh;
		position: fixed;
		top: 0;
		left: 0;
		z-index: -1;
	}
</style>